-- phpMyAdmin SQL Dump
-- version 4.1.14
-- http://www.phpmyadmin.net
--
-- Client :  127.0.0.1
-- Généré le :  Lun 26 Janvier 2015 à 03:22
-- Version du serveur :  5.6.17
-- Version de PHP :  5.5.12

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Base de données :  `gescom`
--

-- --------------------------------------------------------

--
-- Structure de la table `client`
--

CREATE TABLE IF NOT EXISTS `client` (
  `emailcli` varchar(255) NOT NULL,
  PRIMARY KEY (`emailcli`)
) ENGINE=InnoDB DEFAULT CHARSET=latin1;

-- --------------------------------------------------------

--
-- Structure de la table `compte`
--

CREATE TABLE IF NOT EXISTS `compte` (
  `nomcli` varchar(255) NOT NULL,
  `datenaiscli` varchar(10) NOT NULL,
  `adressecli` varchar(255) NOT NULL,
  `telcli` int(10) NOT NULL,
  `emailcli` varchar(255) NOT NULL,
  `pwdcli` varchar(15) NOT NULL,
  PRIMARY KEY (`emailcli`),
  UNIQUE KEY `emailcli_2` (`emailcli`),
  KEY `emailcli` (`emailcli`)
) ENGINE=InnoDB DEFAULT CHARSET=latin1;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
